From 23b4da05696ec0c3a4c48083209ae37facd09acc Mon Sep 17 00:00:00 2001
From: Philipp Gesang <phg42.2a@gmail.com>
Date: Thu, 2 Jan 2014 21:28:37 +0100
Subject: [*] remove tests directory

Testing has been done using the test repo exclusively for quite some
time now: https://bitbucket.org/phg/lua-la-tex-tests. Also, the
``mktests`` script partially automates testing of the font management.

This changeset is just codifying the facts.
If any of the tests deserves preservation please file an issue for
inclusion into the test repo.
Thanks!
---
 tests/opticalsize.tex | 13 -------------
 1 file changed, 13 deletions(-)
 delete mode 100644 tests/opticalsize.tex

(limited to 'tests/opticalsize.tex')

diff --git a/tests/opticalsize.tex b/tests/opticalsize.tex
deleted file mode 100644
index 53b1bb8..0000000
--- a/tests/opticalsize.tex
+++ /dev/null
@@ -1,13 +0,0 @@
-\input luaotfload.sty
-
-\font\testa={Latin Modern Roman/S=12} at 10pt
-\font\testb={Latin Modern Roman}      at 5pt
-\font\testc={Latin Modern Roman}      at 10pt
-\font\testd={Latin Modern Roman/S=15} at 10pt
-\font\teste={Latin Modern Roman/S=3}  at 10pt
-\testa abcd ABCD \par
-\testb abcd ABCD \par
-\testc abcd ABCD \par
-\testd abcd ABCD \par
-\teste abcd ABCD \par
-\bye
-- 
cgit v1.2.3

