From 5cd15c2c16065938ed6ce1bfcc999327ff85698f Mon Sep 17 00:00:00 2001
From: Khaled Hosny <khaledhosny@eglug.org>
Date: Mon, 26 Mar 2012 00:54:35 +0200
Subject: Enable italic correction feature by default

Conflicts:

	otfl-font-xtx.lua
	tests/itlc.tex
---
 tests/itlc.tex | 8 +++-----
 1 file changed, 3 insertions(+), 5 deletions(-)

(limited to 'tests/itlc.tex')

diff --git a/tests/itlc.tex b/tests/itlc.tex
index 01f7a91..bff0c39 100644
--- a/tests/itlc.tex
+++ b/tests/itlc.tex
@@ -1,7 +1,5 @@
 \input luaotfload.sty
-\font\testa={file:lmroman10-italic:script=latn}       at 10pt
-\font\testb={file:lmroman10-italic:script=latn;+itlc} at 10pt
-
-{\testa f\/}!\par
-{\testb f\/}!\par
+\font\testa={Latin Modern Roman:script=latn}   at 10pt
+\font\testb={Latin Modern Roman/I:script=latn} at 10pt
+\testa ({\testb f\/})
 \bye
-- 
cgit v1.2.3

