From 98f453e957ebdac0a3b6a6870700960047314747 Mon Sep 17 00:00:00 2001
From: Khaled Hosny <khaledhosny@eglug.org>
Date: Mon, 10 Oct 2011 22:54:15 +0200
Subject: This does not seem to be an issue anymore

---
 luaotfload.dtx | 10 ----------
 1 file changed, 10 deletions(-)

(limited to 'luaotfload.dtx')

diff --git a/luaotfload.dtx b/luaotfload.dtx
index 11ce7f4..3d316ce 100644
--- a/luaotfload.dtx
+++ b/luaotfload.dtx
@@ -456,16 +456,6 @@ luaotfload.module = {
 local error, warning, info, log = luatexbase.provides_module(luaotfload.module)
 %    \end{macrocode}
 %
-%    This is a necessary initalization in order not to rebuild an existing
-%    font.  Maybe 600 should be replaced by |\pdfpkresolution| or
-%    |texconfig.pk_dpi| (and it should be replaced dynamically), but we don't
-%    have access (yet) to the |texconfig| table, so we let it be 600. Anyway,
-%    it does still work fine even if |\pdfpkresolution| is changed.
-%
-%    \begin{macrocode}
-kpse.init_prog("", 600, "/")
-%    \end{macrocode}
-%
 %    The minimal required \luatex version.
 %
 %    \begin{macrocode}
-- 
cgit v1.2.3

